{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"RIC_CR1","type":"number","width":2,"decimals":0},{"name":"RIC_CR2","type":"number","width":2,"decimals":0},{"name":"RIC_ANA1","type":"number","width":2,"decimals":0},{"name":"RIC_ANA2","type":"number","width":2,"decimals":0},{"name":"RIC_ETA1","type":"number","width":2,"decimals":0},{"name":"RIC_ETA2","type":"number","width":2,"decimals":0},{"name":"RIC_DOM1","type":"number","width":2,"decimals":0},{"name":"RIC_DOM2","type":"number","width":2,"decimals":0},{"name":"RIC_LOC1","type":"number","width":2,"decimals":0},{"name":"RIC_LOC2","type":"number","width":2,"decimals":0},{"name":"RIC_USL1","type":"number","width":2,"decimals":0},{"name":"RIC_USL2","type":"number","width":2,"decimals":0},{"name":"RIC_PRO1","type":"number","width":2,"decimals":0},{"name":"RIC_PRO2","type":"number","width":2,"decimals":0},{"name":"RIC_SEM1","type":"number","width":2,"decimals":0},{"name":"RIC_SEM2","type":"number","width":2,"decimals":0},{"name":"RIC_SEF1","type":"number","width":2,"decimals":0},{"name":"RIC_SEF2","type":"number","width":2,"decimals":0},{"name":"RIC_ESA1","type":"number","width":2,"decimals":0},{"name":"RIC_ESA2","type":"number","width":2,"decimals":0},{"name":"RIC_ESR1","type":"number","width":2,"decimals":0},{"name":"RIC_ESR2","type":"number","width":2,"decimals":0},{"name":"RIC_EST1","type":"number","width":2,"decimals":0},{"name":"RIC_EST2","type":"number","width":2,"decimals":0},{"name":"RIC_RIG11","type":"number","width":2,"decimals":0},{"name":"RIC_RIG12","type":"number","width":2,"decimals":0},{"name":"RIC_RIG21","type":"number","width":2,"decimals":0},{"name":"RIC_RIG22","type":"number","width":2,"decimals":0},{"name":"RIC_RIG31","type":"number","width":2,"decimals":0},{"name":"RIC_RIG32","type":"number","width":2,"decimals":0},{"name":"RIC_RIG41","type":"number","width":2,"decimals":0},{"name":"RIC_RIG42","type":"number","width":2,"decimals":0},{"name":"RIC_MED1","type":"number","width":2,"decimals":0},{"name":"RIC_MED2","type":"number","width":2,"decimals":0},{"name":"RIC_DAT1","type":"number","width":2,"decimals":0},{"name":"RIC_DAT2","type":"number","width":2,"decimals":0},{"name":"RIC_QUA1","type":"number","width":2,"decimals":0},{"name":"RIC_QUA2","type":"number","width":2,"decimals":0},{"name":"RIC_IND1","type":"number","width":2,"decimals":0},{"name":"RIC_IND2","type":"number","width":2,"decimals":0},{"name":"CER_ANA1","type":"number","width":2,"decimals":0},{"name":"CER_ANA2","type":"number","width":2,"decimals":0},{"name":"CER_LOC1","type":"number","width":2,"decimals":0},{"name":"CER_LOC2","type":"number","width":2,"decimals":0},{"name":"CER_DOM1","type":"number","width":2,"decimals":0},{"name":"CER_RIG11","type":"number","width":2,"decimals":0},{"name":"CER_RIG12","type":"number","width":2,"decimals":0},{"name":"CER_RIG21","type":"number","width":2,"decimals":0},{"name":"CER_RIG22","type":"number","width":2,"decimals":0},{"name":"CER_RIG31","type":"number","width":2,"decimals":0},{"name":"CER_RIG32","type":"number","width":2,"decimals":0},{"name":"CER_RIG41","type":"number","width":2,"decimals":0},{"name":"CER_RIG42","type":"number","width":2,"decimals":0},{"name":"CER_MED1","type":"number","width":2,"decimals":0},{"name":"CER_MED2","type":"number","width":2,"decimals":0},{"name":"CER_QUA1","type":"number","width":2,"decimals":0},{"name":"CER_QUA2","type":"number","width":2,"decimals":0},{"name":"CER_IND1","type":"number","width":2,"decimals":0},{"name":"CER_IND2","type":"number","width":2,"decimals":0},{"name":"INDIRIZZO","type":"character","width":33},{"name":"CER_DOM2","type":"number","width":2,"decimals":0},{"name":"CER_CIT1","type":"number","width":2,"decimals":0},{"name":"CER_CIT2","type":"number","width":2,"decimals":0},{"name":"CER_DAT1","type":"number","width":2,"decimals":0},{"name":"CER_DAT2","type":"number","width":2,"decimals":0},{"name":"QUALIFICA","type":"character","width":33},{"name":"TIPO_RIC","type":"character","width":1},{"name":"FATTURA","type":"character","width":4},{"name":"CODFIS","type":"character","width":27},{"name":"MEMO_DI1","type":"character","width":60},{"name":"MEMO_DI2","type":"character","width":60},{"name":"MEMO_DI3","type":"character","width":60},{"name":"MEMO_DI4","type":"character","width":60},{"name":"MEMO_ES1","type":"character","width":60},{"name":"MEMO_ES2","type":"character","width":60},{"name":"MEMO_ES3","type":"character","width":60},{"name":"MEMO_ES4","type":"character","width":60},{"name":"MEMO_IN1","type":"character","width":60},{"name":"MEMO_IN2","type":"character","width":60},{"name":"MEMO_IN3","type":"character","width":60},{"name":"MEMO_IN4","type":"character","width":60},{"name":"F3_RIC","type":"character","width":60},{"name":"F4_RIC","type":"character","width":60},{"name":"F5_RIC","type":"character","width":60},{"name":"F6_RIC","type":"character","width":60},{"name":"F7_RIC","type":"character","width":60},{"name":"F8_RIC","type":"character","width":60},{"name":"F9_RIC","type":"character","width":60},{"name":"F10_RIC","type":"character","width":60},{"name":"F11_RIC","type":"character","width":60},{"name":"F12_RIC","type":"character","width":60},{"name":"D_INCASSI","type":"date","width":8},{"name":"D_AZZER","type":"date","width":8},{"name":"D_DATA","type":"date","width":8},{"name":"T_STAMPA","type":"character","width":12},{"name":"T_INCASSI","type":"number","width":7,"decimals":0},{"name":"TIPO_SSN","type":"character","width":1},{"name":"USL","type":"character","width":5},{"name":"INAIL","type":"character","width":66},{"name":"INAIL1","type":"character","width":66},{"name":"INAIL_C1","type":"character","width":66},{"name":"INAIL_C2","type":"character","width":66},{"name":"INAIL_F1","type":"character","width":66},{"name":"INAIL_F2","type":"character","width":66},{"name":"QUATTRO","type":"character","width":66}],"n_rows":1,"rows_kept":1,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[1,2,3,2,3,32,5,9,5,2,5,30,5,38,5,46,5,52,5,58,7,58,6,64,9,5,11,5,13,5,15,5,16,51,17,38,17,49,18,50,10,5,12,5,11,15,5,16,5,17,5,18,5,21,30,21,35,22,35,"Tel 99945678 - Milano",5,20,5,16,18,"Medico Chirurgo","C",null,null,"Dimesso Ospedale per","Ricovero Ospedale di Desio per","Visita domiciliare non deambulabili",null,"Colesterolo =","Glicemia =","Valore oltre i limiti di normalit\u0085","Esami di routine nella norma.","Colonna Ls = Presenza di","Ecografia  Addome =","Esame con alterazioni patologiche.","Esame senza rilievi patologici.","Due Confezioni","Sei Confezioni","Si richiede Rx arcate dentarie sup. ed inf. in carie       *","Si richiede Pap Test                                       *","Si richiede Es. Urine + Urinocoltura ed ev. antibiogramma","Si richiede Rx torace preoperatorio","Si richiede Ecg preoperatorio","Si richiede ricovero ospedaliero","Si richiede es. citologico su sedimento renale (3 campioni)","Si richiede tampone faringeo ed ev. antibiogramma.","1994-01-01","1993-12-31","1994-12-13","00000ALTRA",0,"S","075MI","Infortunio sul lavoro del","Sulla base della valutazione  clinica eseguita in data  odierna,","certifico che il paziente abbisogna  di cure sino al","Diagnosi:","certifico che il paziente e' guarito senza postumi.  Pertanto e'","compatibile col lavoro dal","Quattro Confezioni"]